$1|1241\$1

IC60

                                                         IC57

                                                                         C322

                                                                         C319

                                                                                                            R12

                                                                                                             C237

                                                             R174 IC12
                                                                                             R173

                                                                                           R172

                                                                                                        R171

                                                                                                        R170

                                              R169

                                       C234

R168

IC58

                           R167

C233

                                      R180

                                               R179

X36

X35

                                                                                                            R178

                                                                                                        R177

                                                                                                                  R176

C250

X34

C249

IC59

R175

                                                                                     U36
                                                                                     U35
                                                                                     U34

                                                                C248

                                                                C247

                                                                    C246

                                                                    C245

                                                        C244

                                                        C243

                                                            C242

                                                            C241

                                                C240

                                                C239

                                                    C238

                                                    C236

                                            C235

                                            C232

                                        C252

                                        C251

                                                                       TP24

TP23

                                                                              C320 C321

                                                                              C323 C324

                                                                                                                   board1: delayline and fanout

                                                                                                                   ORBII 12fold analog optical reciever

                                                                                                      Berlin

                                                                                                      TM TekMT Design by:

            A

                                                                                                             4

                                                                                                             3

                                                                                                             2

                                                                                                             1
1

2

3

4

                                                                                                   E

                                                                             D

                                                       C

                                 B

            A

                                                                                                   E
                                                                             D
                                                       C
                                 B

of

Date: Sheet
13

                                                                                                               DR. TH. MIKOLAJSKI

                                                                                             +

                                                                                   10U

                                                                                       +

                                                                              10U

                                                                                             +

                                                                                   10U
                                                                                       +

                                                                              10U

                                              VSS

                                              VDD

1

2

1

                                        0.1N

1

2

1

2

                                        0.1N

1

2

1

2

                                            0.1U

1

2

1

                                            0.1U

1

2

1

2

                                                    0.1U

1

2

1

                                                    0.1U

1

2

1

                                                0.1N

1

2

1

2

                                                0.1N

1

2

1

                                                            0.1U

1

2

1

2

                                                            0.1U

1

2

1

2

                                                        0.1N

1

2

1

                                                        0.1N

1

2

1

2

                                                                    0.1U

1

2

1

                                                                    0.1U

1

2

1

                                                                0.1N

1

2

1

2

                                                                0.1N

                                                                                                         1 2

                                                                                                              2

                                                                                                         1

                                                                                                         1 2

2

1

50

2 -

3 +
6

7
V+

4

V-
2

3
6

7

4

MAX4278

1

1

            100N

VSS

VDD

                       lemo00

                       1

VSS

VDD

1

2

1

                                                                                                 100N

2

1

                                                                            300

2

                                                                  1 180

1

2

1

2

                                                                       27

lemo00

1

lemo00

1

                                                                                                             1 2

          300

1 2

 180

               VSS

               VDD

1

2

1

2

                                                                                                               100N

                                                         2

1

 150

                                                                                              2 -

                                                                                              3 +
                                                                                                       6

                                                                                                   7
                                                                                                  V+

                                                                                                   4

                                                                                                  V-
                                                                                                   4

                                                                                                   7
                                                                                                       6

                                                                                              3

                                                                                              2

                                                                                                     MAX4278

1 2

                                                                                               50

                                                                                           1

                                                                                           2

                                                                                           1

          180

1

2

1

                    300

2

1

                                                                              10

1 2

                                                                              10

2

1

                                                                 100

1

2

1

2

                                                                   510

                                                           1

                                                         24

                                              2 23

21
22

                         2000NS

                      1

1 2

 510

1

2

1

                                          2 100P

1

2

3

                                                                                         500

                                                                                                             VDD

                                                                                                             VSS

INPUT

                                                           +

                                                     10U

                                                           +

                                                     10U

                              2 -

                              3 +
                                       6

                                   7
                                  V+

                                   4

                                  V-
                                   4

                                   7
                                       6

                              3

                              2

                                     OPA650

                                                                                                       2 -

                                                                                                       3 +
                                                                                                                6

                                                                                                            7
                                                                                                           V+

                                                                                                            4

                                                                                                           V-
                                                                                                       2

                                                                                                       3
                                                                                                                6

                                                                                                            7

                                                                                                            4

                                                                                                              OPA650