$1|1240\$1

IC56

                                                         IC53

                                                                         C316

                                                                         C313

                                                                                                            R11

                                                                                                             C216

                                                             R160 IC11
                                                                                             R159

                                                                                           R158

                                                                                                        R157

                                                                                                        R156

                                              R155

                                       C213

R154

IC54

                           R153

C212

                                      R166

                                               R165

X33

X32

                                                                                                            R164

                                                                                                        R163

                                                                                                                  R162

C229

X31

C228

IC55

R161

                                                                                     U33
                                                                                     U32
                                                                                     U31

                                                                C227

                                                                C226

                                                                    C225

                                                                    C224

                                                        C223

                                                        C222

                                                            C221

                                                            C220

                                                C219

                                                C218

                                                    C217

                                                    C215

                                            C214

                                            C211

                                        C231

                                        C230

                                                                       TP22

TP21

                                                                              C314 C315

                                                                              C317 C318

                                                                                                                   board1: delayline and fanout

                                                                                                                   ORBII 12fold analog optical reciever

                                                                                                      Berlin

                                                                                                      TM TekMT Design by:

            A

                                                                                                             4

                                                                                                             3

                                                                                                             2

                                                                                                             1
1

2

3

4

                                                                                                   E

                                                                             D

                                                       C

                                 B

            A

                                                                                                   E
                                                                             D
                                                       C
                                 B

of

Date: Sheet
13

                                                                                                               DR. TH. MIKOLAJSKI

                                                                                             +

                                                                                   10U

                                                                                       +

                                                                              10U

                                                                                             +

                                                                                   10U
                                                                                       +

                                                                              10U

                                              VSS

                                              VDD

1

2

1

                                        0.1N

1

2

1

2

                                        0.1N

1

2

1

2

                                            0.1U

1

2

1

                                            0.1U

1

2

1

2

                                                    0.1U

1

2

1

                                                    0.1U

1

2

1

                                                0.1N

1

2

1

2

                                                0.1N

1

2

1

                                                            0.1U

1

2

1

2

                                                            0.1U

1

2

1

2

                                                        0.1N

1

2

1

                                                        0.1N

1

2

1

2

                                                                    0.1U

1

2

1

                                                                    0.1U

1

2

1

                                                                0.1N

1

2

1

2

                                                                0.1N

                                                                                                         1 2

                                                                                                              2

                                                                                                         1

                                                                                                         1 2

2

1

50

2 -

3 +
6

7
V+

4

V-
2

3
6

7

4

MAX4278

1

1

            100N

VSS

VDD

                       lemo00

                       1

VSS

VDD

1

2

1

                                                                                                 100N

2

1

                                                                            300

2

                                                                  1 180

1

2

1

2

                                                                       27

lemo00

1

lemo00

1

                                                                                                             1 2

          300

1 2

 180

               VSS

               VDD

1

2

1

2

                                                                                                               100N

                                                         2

1

 150

                                                                                              2 -

                                                                                              3 +
                                                                                                       6

                                                                                                   7
                                                                                                  V+

                                                                                                   4

                                                                                                  V-
                                                                                                   4

                                                                                                   7
                                                                                                       6

                                                                                              3

                                                                                              2

                                                                                                     MAX4278

1 2

                                                                                               50

                                                                                           1

                                                                                           2

                                                                                           1

          180

1

2

1

                    300

2

1

                                                                              10

1 2

                                                                              10

2

1

                                                                 100

1

2

1

2

                                                                   510

                                                           1

                                                         24

                                              2 23

21
22

                         2000NS

                      1

1 2

 510

1

2

1

                                          2 100P

1

2

3

                                                                                         500

                                                                                                             VDD

                                                                                                             VSS

INPUT

                                                           +

                                                     10U

                                                           +

                                                     10U

                              2 -

                              3 +
                                       6

                                   7
                                  V+

                                   4

                                  V-
                                   4

                                   7
                                       6

                              3

                              2

                                     OPA650

                                                                                                       2 -

                                                                                                       3 +
                                                                                                                6

                                                                                                            7
                                                                                                           V+

                                                                                                            4

                                                                                                           V-
                                                                                                       2

                                                                                                       3
                                                                                                                6

                                                                                                            7

                                                                                                            4

                                                                                                              OPA650