$1|1239\$1

IC52

                                                         IC49

                                                                         C310

                                                                         C307

                                                                                                            R10

                                                                                                             C195

                                                             R146 IC10
                                                                                             R145

                                                                                           R144

                                                                                                        R143

                                                                                                        R142

                                              R141

                                       C192

R140

IC50

                           R139

C191

                                      R152

                                               R151

X30

X29

                                                                                                            R150

                                                                                                        R149

                                                                                                                  R148

C208

X28

C207

IC51

R147

                                                                                     U30
                                                                                     U29
                                                                                     U28

                                                                C206

                                                                C205

                                                                    C204

                                                                    C203

                                                        C202

                                                        C201

                                                            C200

                                                            C199

                                                C198

                                                C197

                                                    C196

                                                    C194

                                            C193

                                            C190

                                        C210

                                        C209

                                                                       TP20

TP19

                                                                              C308 C309

                                                                              C311 C312

                                                                                                                   board1: delayline and fanout

                                                                                                                   ORBII 12fold analog optical reciever

                                                                                                      Berlin

                                                                                                      TM TekMT Design by:

            A

                                                                                                             4

                                                                                                             3

                                                                                                             2

                                                                                                             1
1

2

3

4

                                                                                                   E

                                                                             D

                                                       C

                                 B

            A

                                                                                                   E
                                                                             D
                                                       C
                                 B

of

Date: Sheet
13

                                                                                                               DR. TH. MIKOLAJSKI

                                                                                             +

                                                                                   10U

                                                                                       +

                                                                              10U

                                                                                             +

                                                                                   10U
                                                                                       +

                                                                              10U

                                              VSS

                                              VDD

1

2

1

                                        0.1N

1

2

1

2

                                        0.1N

1

2

1

2

                                            0.1U

1

2

1

                                            0.1U

1

2

1

2

                                                    0.1U

1

2

1

                                                    0.1U

1

2

1

                                                0.1N

1

2

1

2

                                                0.1N

1

2

1

                                                            0.1U

1

2

1

2

                                                            0.1U

1

2

1

2

                                                        0.1N

1

2

1

                                                        0.1N

1

2

1

2

                                                                    0.1U

1

2

1

                                                                    0.1U

1

2

1

                                                                0.1N

1

2

1

2

                                                                0.1N

                                                                                                         1 2

                                                                                                              2

                                                                                                         1

                                                                                                         1 2

2

1

50

2 -

3 +
6

7
V+

4

V-
2

3
6

7

4

MAX4278

1

1

            100N

VSS

VDD

                       lemo00

                       1

VSS

VDD

1

2

1

                                                                                                 100N

2

1

                                                                            300

2

                                                                  1 180

1

2

1

2

                                                                       27

lemo00

1

lemo00

1

                                                                                                             1 2

          300

1 2

 180

               VSS

               VDD

1

2

1

2

                                                                                                               100N

                                                         2

1

 150

                                                                                              2 -

                                                                                              3 +
                                                                                                       6

                                                                                                   7
                                                                                                  V+

                                                                                                   4

                                                                                                  V-
                                                                                                   4

                                                                                                   7
                                                                                                       6

                                                                                              3

                                                                                              2

                                                                                                     MAX4278

1 2

                                                                                               50

                                                                                           1

                                                                                           2

                                                                                           1

          180

1

2

1

                    300

2

1

                                                                              10

1 2

                                                                              10

2

1

                                                                 100

1

2

1

2

                                                                   510

                                                           1

                                                         24

                                              2 23

21
22

                         2000NS

                      1

1 2

 510

1

2

1

                                          2 100P

1

2

3

                                                                                         500

                                                                                                             VDD

                                                                                                             VSS

INPUT

                                                           +

                                                     10U

                                                           +

                                                     10U

                              2 -

                              3 +
                                       6

                                   7
                                  V+

                                   4

                                  V-
                                   4

                                   7
                                       6

                              3

                              2

                                     OPA650

                                                                                                       2 -

                                                                                                       3 +
                                                                                                                6

                                                                                                            7
                                                                                                           V+

                                                                                                            4

                                                                                                           V-
                                                                                                       2

                                                                                                       3
                                                                                                                6

                                                                                                            7

                                                                                                            4

                                                                                                              OPA650