$1|1237\$1

IC44

                                                         IC41

                                                                         C298

                                                                         C295

                                                                                                            R8

                                                                                                             C153

                                                             R118 IC8
                                                                                             R117

                                                                                           R116

                                                                                                        R115

                                                                                                        R114

                                              R113

                                       C150

R112

IC42

                           R111

C149

                                      R124

                                               R123

X24

X23

                                                                                                            R122

                                                                                                        R121

                                                                                                                  R120

C166

X22

C165

IC43

R119

                                                                                     U24
                                                                                     U23
                                                                                     U22

                                                                C164

                                                                C163

                                                                    C162

                                                                    C161

                                                        C160

                                                        C159

                                                            C158

                                                            C157

                                                C156

                                                C155

                                                    C154

                                                    C152

                                            C151

                                            C148

                                        C168

                                        C167

                                                                       TP16

TP15

                                                                              C296 C297

                                                                              C299 C300

                                                                                                                   board1: delayline and fanout

                                                                                                                   ORBII 12fold analog optical reciever

                                                                                                      Berlin

                                                                                                      TM TekMT Design by:

            A

                                                                                                             4

                                                                                                             3

                                                                                                             2

                                                                                                             1
1

2

3

4

                                                                                                   E

                                                                             D

                                                       C

                                 B

            A

                                                                                                   E
                                                                             D
                                                       C
                                 B

of

Date: Sheet
13

                                                                                                               DR. TH. MIKOLAJSKI

                                                                                             +

                                                                                   10U

                                                                                       +

                                                                              10U

                                                                                             +

                                                                                   10U
                                                                                       +

                                                                              10U

                                              VSS

                                              VDD

1

2

1

                                        0.1N

1

2

1

2

                                        0.1N

1

2

1

2

                                            0.1U

1

2

1

                                            0.1U

1

2

1

2

                                                    0.1U

1

2

1

                                                    0.1U

1

2

1

                                                0.1N

1

2

1

2

                                                0.1N

1

2

1

                                                            0.1U

1

2

1

2

                                                            0.1U

1

2

1

2

                                                        0.1N

1

2

1

                                                        0.1N

1

2

1

2

                                                                    0.1U

1

2

1

                                                                    0.1U

1

2

1

                                                                0.1N

1

2

1

2

                                                                0.1N

                                                                                                         1 2

                                                                                                              2

                                                                                                         1

                                                                                                         1 2

2

1

50

2 -

3 +
6

7
V+

4

V-
2

3
6

7

4

MAX4278

1

1

            100N

VSS

VDD

                       lemo00

                       1

VSS

VDD

1

2

1

                                                                                                 100N

2

1

                                                                            300

2

                                                                  1 180

1

2

1

2

                                                                       27

lemo00

1

lemo00

1

                                                                                                             1 2

          300

1 2

 180

               VSS

               VDD

1

2

1

2

                                                                                                               100N

                                                         2

1

 150

                                                                                              2 -

                                                                                              3 +
                                                                                                       6

                                                                                                   7
                                                                                                  V+

                                                                                                   4

                                                                                                  V-
                                                                                                   4

                                                                                                   7
                                                                                                       6

                                                                                              3

                                                                                              2

                                                                                                     MAX4278

1 2

                                                                                               50

                                                                                           1

                                                                                           2

                                                                                           1

          180

1

2

1

                    300

2

1

                                                                              10

1 2

                                                                              10

2

1

                                                                 100

1

2

1

2

                                                                   510

                                                           1

                                                         24

                                              2 23

21
22

                         2000NS

                      1

1 2

 510

1

2

1

                                          2 100P

1

2

3

                                                                                         500

                                                                                                             VDD

                                                                                                             VSS

INPUT

                                                           +

                                                     10U

                                                           +

                                                     10U

                              2 -

                              3 +
                                       6

                                   7
                                  V+

                                   4

                                  V-
                                   4

                                   7
                                       6

                              3

                              2

                                     OPA650

                                                                                                       2 -

                                                                                                       3 +
                                                                                                                6

                                                                                                            7
                                                                                                           V+

                                                                                                            4

                                                                                                           V-
                                                                                                       2

                                                                                                       3
                                                                                                                6

                                                                                                            7

                                                                                                            4

                                                                                                              OPA650